; xpad.def : Declares the module parameters for the DLL.

LIBRARY      "xpad"

EXPORTS
    ; Explicit exports can go here
    PSEgetLibType
    PSEgetLibName
    PSEgetLibVersion
    PS2EgetLibType
    PS2EgetLibName
    PS2EgetLibVersion2
    PADinit
    PADshutdown
    PADopen
    PADclose
    PADkeyEvent
    PADstartPoll
    PADpoll
    PADquery
    PADconfigure
    PADtest
    PADabout
    PADreadPort
    PADreadPort1
    PADreadPort2
